; eventComLT.def : Declares the module parameters for the DLL.

LIBRARY      "eventsComLT"
DESCRIPTION  'eventsComLT Windows Dynamic Link Library'

EXPORTS
 LIBRARYENTRY @1
 LIBRARYID    @2
 LibInterfaceNotifyEntry @3
